-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.2641689331
cusum  =  0.104077899415
eta  =  0.619688812557
hl_amp_ratio  =  0.344865322986
kurtosis  =  -0.372482505065
n_points  =  306
period  =  0.627701689743
period_SNR  =  36.2821247171
period_log10FAP  =  -35.6917772463
period_uncertainty  =  0.000110846526195
phase_cusum  =  0.246322384844
phase_eta  =  0.290907555373
phi21  =  -2.03564164934
phi31  =  -1.01932782389
quartile31  =  0.3275
r21  =  0.326091326938
r31  =  0.29255180514
shapiro_w  =  0.913451433182
skewness  =  -0.77596586254
slope_per10  =  -0.180569855257
slope_per90  =  0.193099998869
stetson_k  =  0.750223143639
weighted_mean  =  15.5448560597
weighted_std  =  0.21478505664
