-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.253974201614
cusum  =  0.113344734705
eta  =  0.840091096364
hl_amp_ratio  =  0.455302837221
kurtosis  =  -0.286791163143
n_points  =  342
period  =  0.611991643022
period_SNR  =  55.0591024572
period_log10FAP  =  -45.3431666442
period_uncertainty  =  0.000149683499378
phase_cusum  =  0.224090917493
phase_eta  =  0.500333549789
phi21  =  -2.28313943138
phi31  =  -1.15887117772
quartile31  =  0.29
r21  =  0.315116178141
r31  =  0.208030103021
shapiro_w  =  0.944851160049
skewness  =  -0.685860272128
slope_per10  =  -0.0973687910243
slope_per90  =  0.118413818722
stetson_k  =  0.768112456444
weighted_mean  =  15.6891505796
weighted_std  =  0.198544799027
