-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_d
class_probability =  0.62


######### Lightcurve features #########

amplitude  =  0.173189087208
cusum  =  0.0905036630243
eta  =  0.527676115121
hl_amp_ratio  =  0.651755239776
kurtosis  =  -0.372616518382
n_points  =  406
period  =  0.344905491688
period_SNR  =  44.6626431815
period_log10FAP  =  -46.7163812383
period_uncertainty  =  3.18519351439e-05
phase_cusum  =  0.212538959724
phase_eta  =  0.726589788904
phi21  =  4.4951735324
phi31  =  5.18028139856
quartile31  =  0.23
r21  =  0.125602769632
r31  =  0.0923579152428
shapiro_w  =  0.95643144846
skewness  =  -0.600649453421
slope_per10  =  -0.0450258109665
slope_per90  =  0.080089108965
stetson_k  =  0.79843434187
weighted_mean  =  16.1961817646
weighted_std  =  0.157787703875
