-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.87


######### Lightcurve features #########

amplitude  =  0.303710817826
cusum  =  0.263758745335
eta  =  0.696952014317
hl_amp_ratio  =  0.54028741165
kurtosis  =  -0.890881690415
n_points  =  85
period  =  0.55316689685
period_SNR  =  13.4593874997
period_log10FAP  =  -8.26121921673
period_uncertainty  =  0.000132806810588
phase_cusum  =  0.369018262586
phase_eta  =  0.22413327997
phi21  =  -1.98956030254
phi31  =  -3.97560448076
quartile31  =  0.37
r21  =  0.360147919843
r31  =  0.25164865903
shapiro_w  =  0.933802723885
skewness  =  -0.469180137154
slope_per10  =  -0.479750004597
slope_per90  =  0.361528136285
stetson_k  =  0.788897949159
weighted_mean  =  15.8452529207
weighted_std  =  0.231156534025
