-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.183266052964
cusum  =  0.185669279742
eta  =  0.654467488728
hl_amp_ratio  =  0.961183350543
kurtosis  =  -0.294986897024
n_points  =  369
period  =  0.726846104395
period_SNR  =  32.233007424
period_log10FAP  =  -30.7565584947
period_uncertainty  =  0.000148420757472
phase_cusum  =  0.237145201946
phase_eta  =  0.759373775181
phi21  =  -2.32678275824
phi31  =  -3.9466806359
quartile31  =  0.28
r21  =  0.32602378848
r31  =  0.169323635244
shapiro_w  =  0.988300800323
skewness  =  -0.00877746489641
slope_per10  =  -0.112417711571
slope_per90  =  0.141949997051
stetson_k  =  0.839066152076
weighted_mean  =  12.2939963834
weighted_std  =  0.179717821782
