-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.306501982393
cusum  =  0.160136501714
eta  =  0.469426043795
hl_amp_ratio  =  0.635380191459
kurtosis  =  -0.755484937728
n_points  =  196
period  =  0.61429700612
period_SNR  =  24.736611377
period_log10FAP  =  -22.3747356867
period_uncertainty  =  0.000147870675591
phase_cusum  =  0.250384948462
phase_eta  =  0.261959534341
phi21  =  -2.14155690666
phi31  =  -1.32973987717
quartile31  =  0.48
r21  =  0.439121594486
r31  =  0.260745369636
shapiro_w  =  0.920025467873
skewness  =  -0.608428561508
slope_per10  =  -0.149274619728
slope_per90  =  0.416950663803
stetson_k  =  0.809883000171
weighted_mean  =  14.3730430622
weighted_std  =  0.296996645966
