<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.37


######### Lightcurve features #########

amplitude  =  0.233784980994
cusum  =  0.222556530279
eta  =  0.766906383496
hl_amp_ratio  =  0.480693605776
kurtosis  =  -1.14867165248
n_points  =  98
period  =  1.49755063963
period_SNR  =  15.4088608763
period_log10FAP  =  -11.2734907995
period_uncertainty  =  0.00136318114226
phase_cusum  =  0.365171052239
phase_eta  =  0.29576165001
phi21  =  1.0593207202
phi31  =  1.98934806186
quartile31  =  0.4
r21  =  0.270735757705
r31  =  0.0775358212479
shapiro_w  =  0.906604707241
skewness  =  -0.479879229783
slope_per10  =  -0.436854169474
slope_per90  =  0.827600015327
stetson_k  =  0.790268690674
weighted_mean  =  15.2451079878
weighted_std  =  0.22206257904
</pre></body></html>