-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.187601197038
cusum  =  0.198411163388
eta  =  0.542904717517
hl_amp_ratio  =  0.693325453443
kurtosis  =  -0.820209400583
n_points  =  279
period  =  0.592967128006
period_SNR  =  45.8049231736
period_log10FAP  =  -39.9158470712
period_uncertainty  =  0.000181335528223
phase_cusum  =  0.314979785706
phase_eta  =  0.303854755019
phi21  =  0.919578696618
phi31  =  2.1400917261
quartile31  =  0.27
r21  =  0.329884898822
r31  =  0.182189620554
shapiro_w  =  0.956503748894
skewness  =  -0.35932935089
slope_per10  =  -0.183395848008
slope_per90  =  0.16259519022
stetson_k  =  0.854169787252
weighted_mean  =  14.5661891843
weighted_std  =  0.157675628581
