-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.98


######### Lightcurve features #########

amplitude  =  0.18524652046
cusum  =  0.143764349668
eta  =  0.67524483861
hl_amp_ratio  =  0.487598276132
kurtosis  =  -0.847145869497
n_points  =  273
period  =  0.732803128324
period_SNR  =  40.12084459
period_log10FAP  =  -32.6420610426
period_uncertainty  =  0.000182713557317
phase_cusum  =  0.244204510976
phase_eta  =  0.596920367497
phi21  =  0.588290729004
phi31  =  -1.13725448994
quartile31  =  0.27
r21  =  0.325718024858
r31  =  0.130306437432
shapiro_w  =  0.945180654526
skewness  =  -0.457500055354
slope_per10  =  -0.14967036776
slope_per90  =  0.201596887364
stetson_k  =  0.805653794353
weighted_mean  =  16.4971550328
weighted_std  =  0.166401030148
