-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.322492259146
cusum  =  0.14303746366
eta  =  0.569910827796
hl_amp_ratio  =  0.328003215664
kurtosis  =  -0.827057363513
n_points  =  408
period  =  0.628141790262
period_SNR  =  49.045756601
period_log10FAP  =  -53.1827699391
period_uncertainty  =  0.000109868783444
phase_cusum  =  0.204208875736
phase_eta  =  0.174510202917
phi21  =  -2.3344606944
phi31  =  -1.32422495844
quartile31  =  0.4425
r21  =  0.455562482211
r31  =  0.330299402884
shapiro_w  =  0.883605420589
skewness  =  -0.715155071344
slope_per10  =  -0.109080915674
slope_per90  =  0.142022223878
stetson_k  =  0.747620171533
weighted_mean  =  16.7218264789
weighted_std  =  0.291427311472
