-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.383443094008
cusum  =  0.156377093017
eta  =  0.517502680278
hl_amp_ratio  =  0.556992773972
kurtosis  =  -0.831636476509
n_points  =  406
period  =  0.651386433628
period_SNR  =  43.9442993536
period_log10FAP  =  -40.164159615
period_uncertainty  =  0.000144112049892
phase_cusum  =  0.216760430749
phase_eta  =  0.3665942772
phi21  =  -2.08897216863
phi31  =  -4.02048334447
quartile31  =  0.5675
r21  =  0.536301905246
r31  =  0.416234380934
shapiro_w  =  0.954502761364
skewness  =  -0.373850440078
slope_per10  =  -0.0927730888062
slope_per90  =  0.111115482137
stetson_k  =  0.795753503198
weighted_mean  =  11.8615560166
weighted_std  =  0.39971019841
