-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.78


######### Lightcurve features #########

amplitude  =  0.231245709648
cusum  =  0.102132270372
eta  =  0.578908510687
hl_amp_ratio  =  0.464525970335
kurtosis  =  -0.516343666998
n_points  =  337
period  =  0.534625183657
period_SNR  =  40.4933305941
period_log10FAP  =  -38.5473894572
period_uncertainty  =  0.000110342505476
phase_cusum  =  0.224675003851
phase_eta  =  0.602574581878
phi21  =  -2.31680367412
phi31  =  -0.540099744407
quartile31  =  0.33
r21  =  0.269200912797
r31  =  0.194502620712
shapiro_w  =  0.93154579401
skewness  =  -0.685576912957
slope_per10  =  -0.0987047212871
slope_per90  =  0.089474289101
stetson_k  =  0.759887222452
weighted_mean  =  15.656045723
weighted_std  =  0.214715555203
