-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.83


######### Lightcurve features #########

amplitude  =  0.375846117512
cusum  =  0.13874497458
eta  =  0.553286945845
hl_amp_ratio  =  0.363722037774
kurtosis  =  -0.709208397012
n_points  =  301
period  =  0.701144571898
period_SNR  =  41.243881331
period_log10FAP  =  -44.9404490024
period_uncertainty  =  0.000137070808105
phase_cusum  =  0.244508768096
phase_eta  =  0.1427486024
phi21  =  3.92002957379
phi31  =  4.52045923255
quartile31  =  0.5
r21  =  0.328143398798
r31  =  0.250804083947
shapiro_w  =  0.878336489201
skewness  =  -0.740361114693
slope_per10  =  -0.193173511937
slope_per90  =  0.348887289417
stetson_k  =  0.7537008072
weighted_mean  =  14.3930717785
weighted_std  =  0.32071298001
