-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.172177453415
cusum  =  0.136256254993
eta  =  0.574419770538
hl_amp_ratio  =  0.661764957626
kurtosis  =  -1.14028486364
n_points  =  275
period  =  0.596837963853
period_SNR  =  42.1485243144
period_log10FAP  =  -38.9947468999
period_uncertainty  =  0.000202002989312
phase_cusum  =  0.236798435539
phase_eta  =  0.238732035719
phi21  =  1.2512502646
phi31  =  2.68958118399
quartile31  =  0.27
r21  =  0.379463018789
r31  =  0.175131125706
shapiro_w  =  0.943399548531
skewness  =  -0.320383028456
slope_per10  =  -0.18493689801
slope_per90  =  0.248890973478
stetson_k  =  0.840393377187
weighted_mean  =  14.8529187628
weighted_std  =  0.151829317047
