<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_1O
class_probability =  0.36


######### Lightcurve features #########

amplitude  =  0.315511638268
cusum  =  0.17805718854
eta  =  0.804794832276
hl_amp_ratio  =  0.400136764712
kurtosis  =  -1.42088871313
n_points  =  78
period  =  0.40326064998
period_SNR  =  15.0300710182
period_log10FAP  =  -8.58968311177
period_uncertainty  =  8.22393526464e-05
phase_cusum  =  0.242245385419
phase_eta  =  0.293762674399
phi21  =  -1.48682693496
phi31  =  -3.13600182079
quartile31  =  0.535
r21  =  0.174302885795
r31  =  0.0530297490929
shapiro_w  =  0.858926475048
skewness  =  -0.284142490763
slope_per10  =  -0.278500001878
slope_per90  =  0.497214094407
stetson_k  =  0.8344995841
weighted_mean  =  11.6087799564
weighted_std  =  0.25824325554
</pre></body></html>