-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.270857989239
cusum  =  0.15559196137
eta  =  0.49571560426
hl_amp_ratio  =  0.459770128414
kurtosis  =  -0.848180895357
n_points  =  406
period  =  0.558508803015
period_SNR  =  51.2206760733
period_log10FAP  =  -53.5852554826
period_uncertainty  =  0.000100228896513
phase_cusum  =  0.261416014213
phase_eta  =  0.178937231273
phi21  =  0.935173625739
phi31  =  -1.04615626846
quartile31  =  0.41
r21  =  0.488557509242
r31  =  0.36979706287
shapiro_w  =  0.938563883305
skewness  =  -0.518618702845
slope_per10  =  -0.100411961515
slope_per90  =  0.135969083671
stetson_k  =  0.777736227478
weighted_mean  =  16.6498726543
weighted_std  =  0.254082906487
