<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  T2CEPH
class_probability =  0.76


######### Lightcurve features #########

amplitude  =  0.326078959292
cusum  =  0.164662745167
eta  =  0.563166868867
hl_amp_ratio  =  0.827465335929
kurtosis  =  -1.1055257919
n_points  =  188
period  =  1.26781497805
period_SNR  =  26.0906507581
period_log10FAP  =  -24.9310796668
period_uncertainty  =  0.000463721704793
phase_cusum  =  0.322023536239
phase_eta  =  0.258629930488
phi21  =  -2.01180534509
phi31  =  -4.43540340701
quartile31  =  0.5725
r21  =  0.349245456532
r31  =  0.240397292838
shapiro_w  =  0.907442986965
skewness  =  -0.350831749377
slope_per10  =  -0.334750001784
slope_per90  =  0.544700003229
stetson_k  =  0.881120357381
weighted_mean  =  13.5963843763
weighted_std  =  0.309627567324
</pre></body></html>