<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.49


######### Lightcurve features #########

amplitude  =  0.160196609971
cusum  =  0.183927093473
eta  =  0.67707993314
hl_amp_ratio  =  0.902187246764
kurtosis  =  -1.21540984262
n_points  =  95
period  =  0.180497794169
period_SNR  =  12.5229119457
period_log10FAP  =  -6.41745489317
period_uncertainty  =  1.2559280641e-05
phase_cusum  =  0.261028285594
phase_eta  =  0.784790482341
phi21  =  3.40572813475
phi31  =  5.93274783917
quartile31  =  0.265
r21  =  0.104669659943
r31  =  0.129894475186
shapiro_w  =  0.950179934502
skewness  =  -0.0132704524114
slope_per10  =  -0.0862216714159
slope_per90  =  0.176767390956
stetson_k  =  0.850955686777
weighted_mean  =  14.1715020404
weighted_std  =  0.147004494112
</pre></body></html>