-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.316678239938
cusum  =  0.139948206841
eta  =  0.55633533164
hl_amp_ratio  =  0.40979359539
kurtosis  =  -0.891181062229
n_points  =  410
period  =  0.635612257539
period_SNR  =  48.3465194367
period_log10FAP  =  -53.8699983662
period_uncertainty  =  0.00011249774808
phase_cusum  =  0.255431879053
phase_eta  =  0.0809080294334
phi21  =  0.891299548166
phi31  =  1.97623035332
quartile31  =  0.4375
r21  =  0.475673639966
r31  =  0.371857592306
shapiro_w  =  0.918211817741
skewness  =  -0.577842938716
slope_per10  =  -0.0888855628249
slope_per90  =  0.140211588095
stetson_k  =  0.777862371218
weighted_mean  =  16.4797199412
weighted_std  =  0.281986110318
