-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.2590335232
cusum  =  0.149937356002
eta  =  1.08064776087
hl_amp_ratio  =  0.745129993881
kurtosis  =  -0.533278478774
n_points  =  276
period  =  0.509265926942
period_SNR  =  37.6834268485
period_log10FAP  =  -25.7915830889
period_uncertainty  =  0.000118841595647
phase_cusum  =  0.302911874356
phase_eta  =  0.819131615758
phi21  =  -2.15940945815
phi31  =  -3.60854873451
quartile31  =  0.3425
r21  =  0.332130744221
r31  =  0.171675849419
shapiro_w  =  0.987536728382
skewness  =  -0.0724894454772
slope_per10  =  -0.0663502199087
slope_per90  =  0.0527828947469
stetson_k  =  0.773112578626
weighted_mean  =  17.8841142844
weighted_std  =  0.236135890843
