-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.89


######### Lightcurve features #########

amplitude  =  0.260381242073
cusum  =  0.187057272206
eta  =  0.561279046126
hl_amp_ratio  =  0.304454443278
kurtosis  =  0.386124911247
n_points  =  257
period  =  0.559639027946
period_SNR  =  27.7144499256
period_log10FAP  =  -24.48361681
period_uncertainty  =  0.000143194282714
phase_cusum  =  0.23880803481
phase_eta  =  0.367476659917
phi21  =  -2.30272148077
phi31  =  -4.48995122099
quartile31  =  0.28
r21  =  0.578098975641
r31  =  0.436499959263
shapiro_w  =  0.882573544979
skewness  =  -1.10823418491
slope_per10  =  -0.151073752455
slope_per90  =  0.321599999443
stetson_k  =  0.673467374925
weighted_mean  =  16.3135904776
weighted_std  =  0.254596087389
