-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.33731031036
cusum  =  0.171535854182
eta  =  0.485513073076
hl_amp_ratio  =  0.326911176755
kurtosis  =  0.473692472103
n_points  =  226
period  =  0.599369286942
period_SNR  =  28.181045348
period_log10FAP  =  -24.8215466803
period_uncertainty  =  0.000193137274624
phase_cusum  =  0.230914720876
phase_eta  =  0.114796572867
phi21  =  0.718533472257
phi31  =  -1.61837734064
quartile31  =  0.26
r21  =  0.568257308315
r31  =  0.370499838769
shapiro_w  =  0.873244404793
skewness  =  -1.15599250905
slope_per10  =  -0.165563798024
slope_per90  =  0.414499980397
stetson_k  =  0.703517150244
weighted_mean  =  13.0934119497
weighted_std  =  0.242346677424
