-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.270737327331
cusum  =  0.158542182866
eta  =  0.818906549954
hl_amp_ratio  =  0.698994174197
kurtosis  =  -0.570410106142
n_points  =  276
period  =  0.561890947077
period_SNR  =  41.8002222388
period_log10FAP  =  -29.3337995614
period_uncertainty  =  0.000144686747009
phase_cusum  =  0.291384546274
phase_eta  =  0.556658496565
phi21  =  -2.44556898233
phi31  =  -4.22272317119
quartile31  =  0.38
r21  =  0.341439571235
r31  =  0.205469907316
shapiro_w  =  0.981657624245
skewness  =  -0.31314194061
slope_per10  =  -0.109381463994
slope_per90  =  0.0585787081586
stetson_k  =  0.762841679293
weighted_mean  =  17.9576334557
weighted_std  =  0.25283512018
