-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.280005619133
cusum  =  0.0867811482518
eta  =  0.603846825188
hl_amp_ratio  =  0.60329615155
kurtosis  =  -0.428635608889
n_points  =  340
period  =  0.579527497069
period_SNR  =  37.5428526331
period_log10FAP  =  -37.465444316
period_uncertainty  =  0.000113233200311
phase_cusum  =  0.236517748567
phase_eta  =  0.59281601929
phi21  =  0.662310009321
phi31  =  1.41053660601
quartile31  =  0.3425
r21  =  0.345053259697
r31  =  0.0864040599022
shapiro_w  =  0.958571195602
skewness  =  -0.550115138156
slope_per10  =  -0.111587408754
slope_per90  =  0.126920521953
stetson_k  =  0.809487314592
weighted_mean  =  13.0365294118
weighted_std  =  0.238046613737
