-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.9


######### Lightcurve features #########

amplitude  =  0.374694367111
cusum  =  0.159589886027
eta  =  0.575909369303
hl_amp_ratio  =  0.447673420344
kurtosis  =  -0.263371637498
n_points  =  267
period  =  0.605445726155
period_SNR  =  36.1688139947
period_log10FAP  =  -31.4206477819
period_uncertainty  =  0.000124722739514
phase_cusum  =  0.254239557233
phase_eta  =  0.0581994742584
phi21  =  0.720916560657
phi31  =  1.71853580849
quartile31  =  0.385
r21  =  0.468480336057
r31  =  0.371683092729
shapiro_w  =  0.881124079227
skewness  =  -0.907508208713
slope_per10  =  -0.248748315008
slope_per90  =  0.268085634747
stetson_k  =  0.760620770921
weighted_mean  =  14.4881431248
weighted_std  =  0.295137997534
