-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.238830166852
cusum  =  0.0895250757449
eta  =  0.623877693357
hl_amp_ratio  =  0.512073808043
kurtosis  =  -0.404223643847
n_points  =  277
period  =  0.561818603708
period_SNR  =  40.2012677872
period_log10FAP  =  -32.8985349807
period_uncertainty  =  0.000108501086261
phase_cusum  =  0.270992126742
phase_eta  =  0.174621755847
phi21  =  0.943701359287
phi31  =  2.28963498158
quartile31  =  0.35
r21  =  0.47215682785
r31  =  0.309615900757
shapiro_w  =  0.949608266354
skewness  =  -0.59795731316
slope_per10  =  -0.15590301621
slope_per90  =  0.176039168691
stetson_k  =  0.777633079409
weighted_mean  =  13.9697778708
weighted_std  =  0.219108482956
