-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.85


######### Lightcurve features #########

amplitude  =  0.143201623282
cusum  =  0.0960722771424
eta  =  0.623557952054
hl_amp_ratio  =  0.712205311688
kurtosis  =  -1.13158528793
n_points  =  330
period  =  0.817791278339
period_SNR  =  45.7541371529
period_log10FAP  =  -49.0157797769
period_uncertainty  =  0.000186166299176
phase_cusum  =  0.238409627931
phase_eta  =  0.214739150106
phi21  =  -1.86884740891
phi31  =  -3.17827065975
quartile31  =  0.21
r21  =  0.36696202495
r31  =  0.068371850771
shapiro_w  =  0.949262142181
skewness  =  -0.139071196167
slope_per10  =  -0.345124712229
slope_per90  =  0.320700557752
stetson_k  =  0.847038206048
weighted_mean  =  14.889498913
weighted_std  =  0.114942419417
