-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  CEPH_Other
class_probability =  0.31


######### Lightcurve features #########

amplitude  =  0.172534160717
cusum  =  0.154671295152
eta  =  0.619308490352
hl_amp_ratio  =  0.388373076737
kurtosis  =  -1.40295762853
n_points  =  124
period  =  0.380381246826
period_SNR  =  18.430570004
period_log10FAP  =  -16.6766108774
period_uncertainty  =  4.02485769368e-05
phase_cusum  =  0.250235704873
phase_eta  =  0.147761505049
phi21  =  -1.77786376399
phi31  =  -3.54571714891
quartile31  =  0.27
r21  =  0.116112707369
r31  =  0.130525413158
shapiro_w  =  0.863008916378
skewness  =  -0.454998728738
slope_per10  =  -0.404500006698
slope_per90  =  0.467000016943
stetson_k  =  0.802239518269
weighted_mean  =  13.5606451613
weighted_std  =  0.130937943535
