-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.280604412897
cusum  =  0.0994019944778
eta  =  0.605468271506
hl_amp_ratio  =  0.553360243695
kurtosis  =  -0.547516213286
n_points  =  311
period  =  0.661422636464
period_SNR  =  40.4197500058
period_log10FAP  =  -41.9906074403
period_uncertainty  =  0.000121817934655
phase_cusum  =  0.25166565417
phase_eta  =  0.0494408049912
phi21  =  4.01165569802
phi31  =  4.90849538326
quartile31  =  0.36
r21  =  0.398055420058
r31  =  0.379893802921
shapiro_w  =  0.900736510754
skewness  =  -0.693175543677
slope_per10  =  -0.283685171657
slope_per90  =  0.33916660133
stetson_k  =  0.84307986945
weighted_mean  =  13.4456428187
weighted_std  =  0.230852324005
