-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.312627771869
cusum  =  0.188247134573
eta  =  0.550708843011
hl_amp_ratio  =  0.419504475954
kurtosis  =  -0.143614325036
n_points  =  269
period  =  0.516750690944
period_SNR  =  32.1596386832
period_log10FAP  =  -31.0128002364
period_uncertainty  =  0.000115281810385
phase_cusum  =  0.252729057312
phase_eta  =  0.248876729694
phi21  =  0.865920161982
phi31  =  1.8683607832
quartile31  =  0.33
r21  =  0.46088892279
r31  =  0.208909292902
shapiro_w  =  0.905497610569
skewness  =  -0.897465140463
slope_per10  =  -0.088056860141
slope_per90  =  0.210417951929
stetson_k  =  0.725412259661
weighted_mean  =  14.3810936241
weighted_std  =  0.240269708314
