-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.96


######### Lightcurve features #########

amplitude  =  0.354452781
cusum  =  0.186643631298
eta  =  0.641131285461
hl_amp_ratio  =  0.856325395864
kurtosis  =  -0.859894208883
n_points  =  214
period  =  0.518976857196
period_SNR  =  28.0216723518
period_log10FAP  =  -24.5852537837
period_uncertainty  =  0.000111752127642
phase_cusum  =  0.257944272026
phase_eta  =  0.346324201745
phi21  =  1.40476534368
phi31  =  2.92383522976
quartile31  =  0.505
r21  =  0.418421328619
r31  =  0.288042939391
shapiro_w  =  0.95027834177
skewness  =  -0.366226608457
slope_per10  =  -0.138817263897
slope_per90  =  0.242566676655
stetson_k  =  0.846358873974
weighted_mean  =  12.7172801303
weighted_std  =  0.300957911008
