-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.94


######### Lightcurve features #########

amplitude  =  0.255730280348
cusum  =  0.150749670576
eta  =  0.604490664708
hl_amp_ratio  =  0.754514410943
kurtosis  =  -0.96772460461
n_points  =  292
period  =  0.63292245013
period_SNR  =  43.7335865781
period_log10FAP  =  -38.883797969
period_uncertainty  =  0.000137214007062
phase_cusum  =  0.269031570688
phase_eta  =  0.334528856265
phi21  =  -1.90103195085
phi31  =  -0.437888263617
quartile31  =  0.3225
r21  =  0.465819041465
r31  =  0.187121125093
shapiro_w  =  0.96700078249
skewness  =  -0.179574568217
slope_per10  =  -0.143884473171
slope_per90  =  0.289435561025
stetson_k  =  0.841235693603
weighted_mean  =  13.278690656
weighted_std  =  0.208831506004
