-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.93


######### Lightcurve features #########

amplitude  =  0.155341010575
cusum  =  0.155734478246
eta  =  0.668488343105
hl_amp_ratio  =  0.936197896669
kurtosis  =  -0.949775803707
n_points  =  398
period  =  0.818745691764
period_SNR  =  54.2846535036
period_log10FAP  =  -55.6739070052
period_uncertainty  =  0.000185471577586
phase_cusum  =  0.221995870191
phase_eta  =  0.277224592447
phi21  =  -2.12317896226
phi31  =  -3.90801864397
quartile31  =  0.2
r21  =  0.399175989187
r31  =  0.197608183605
shapiro_w  =  0.970991969109
skewness  =  -0.0786736045892
slope_per10  =  -0.192013809286
slope_per90  =  0.217490315785
stetson_k  =  0.855380832665
weighted_mean  =  16.1255820797
weighted_std  =  0.117221654233
