-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.95


######### Lightcurve features #########

amplitude  =  0.210522270037
cusum  =  0.167902930374
eta  =  0.595804021639
hl_amp_ratio  =  0.283938662002
kurtosis  =  0.156230116245
n_points  =  307
period  =  0.659957130112
period_SNR  =  37.0442094929
period_log10FAP  =  -35.9141801378
period_uncertainty  =  0.000122677736635
phase_cusum  =  0.295780525299
phase_eta  =  0.259967536741
phi21  =  0.750079609336
phi31  =  -1.0727189316
quartile31  =  0.24
r21  =  0.350489957599
r31  =  0.350332320725
shapiro_w  =  0.902032494545
skewness  =  -0.921920443584
slope_per10  =  -0.184915790813
slope_per90  =  0.286149990279
stetson_k  =  0.68853014651
weighted_mean  =  13.4704300287
weighted_std  =  0.181442568453
