-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.233750739336
cusum  =  0.165049387094
eta  =  0.653439411669
hl_amp_ratio  =  0.333405606509
kurtosis  =  0.19690335711
n_points  =  229
period  =  0.560475707606
period_SNR  =  32.153468553
period_log10FAP  =  -24.5026795159
period_uncertainty  =  0.000173402605628
phase_cusum  =  0.282676695833
phase_eta  =  0.272556904691
phi21  =  0.693848496653
phi31  =  1.98231533626
quartile31  =  0.22
r21  =  0.382824202977
r31  =  0.268513300649
shapiro_w  =  0.885393500328
skewness  =  -1.03653269002
slope_per10  =  -0.214103112956
slope_per90  =  0.300081639295
stetson_k  =  0.660738707534
weighted_mean  =  14.8891683319
weighted_std  =  0.172320709117
