-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.334387721889
cusum  =  0.163484099876
eta  =  0.485507555017
hl_amp_ratio  =  0.442717228795
kurtosis  =  -0.248997570916
n_points  =  316
period  =  0.600950276997
period_SNR  =  40.5325195585
period_log10FAP  =  -41.0017908293
period_uncertainty  =  0.000100513529996
phase_cusum  =  0.22888223367
phase_eta  =  0.333672639972
phi21  =  -2.15253122801
phi31  =  -1.3892960137
quartile31  =  0.38
r21  =  0.369058067097
r31  =  0.194936427949
shapiro_w  =  0.899068951607
skewness  =  -0.857530834488
slope_per10  =  -0.0963822570134
slope_per90  =  0.126699998509
stetson_k  =  0.745193654921
weighted_mean  =  14.6135229947
weighted_std  =  0.28350207122
