-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.28197286459
cusum  =  0.19474743374
eta  =  0.436294630054
hl_amp_ratio  =  0.635259457942
kurtosis  =  -1.10034453645
n_points  =  390
period  =  0.69505813516
period_SNR  =  51.5281796535
period_log10FAP  =  -56.8147249842
period_uncertainty  =  0.000134503088503
phase_cusum  =  0.244865654967
phase_eta  =  0.268534086075
phi21  =  1.00142280855
phi31  =  2.0773358117
quartile31  =  0.48
r21  =  0.418377760395
r31  =  0.213280989382
shapiro_w  =  0.935411512852
skewness  =  -0.325519552194
slope_per10  =  -0.168605048391
slope_per90  =  0.158398509953
stetson_k  =  0.829371172555
weighted_mean  =  16.0538050955
weighted_std  =  0.269022905767
