-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.273066844762
cusum  =  0.113350628201
eta  =  0.573585998143
hl_amp_ratio  =  0.340245098119
kurtosis  =  -0.433997430444
n_points  =  255
period  =  0.557283339051
period_SNR  =  39.0218202559
period_log10FAP  =  -32.5243422937
period_uncertainty  =  0.000123903683213
phase_cusum  =  0.279093937325
phase_eta  =  0.251374717379
phi21  =  0.789482777974
phi31  =  1.87592422492
quartile31  =  0.345
r21  =  0.415322614037
r31  =  0.288315114927
shapiro_w  =  0.905413985252
skewness  =  -0.808883731818
slope_per10  =  -0.125335965953
slope_per90  =  0.12727634132
stetson_k  =  0.709762454885
weighted_mean  =  15.9358142855
weighted_std  =  0.250873235172
