-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  DSCT
class_probability =  0.54


######### Lightcurve features #########

amplitude  =  0.676826159547
cusum  =  0.145119655625
eta  =  1.45019682469
hl_amp_ratio  =  0.643659076818
kurtosis  =  -0.542917358294
n_points  =  163
period  =  0.0694948614167
period_SNR  =  10.7951113595
period_log10FAP  =  -1.89886383114
period_uncertainty  =  1.38018075634e-06
phase_cusum  =  0.142081724026
phase_eta  =  1.79232478772
phi21  =  2.11109933022
phi31  =  2.65556907286
quartile31  =  1.69
r21  =  0.212013389843
r31  =  0.226793369215
shapiro_w  =  0.964752852917
skewness  =  -0.419374477594
slope_per10  =  -0.00127755603747
slope_per90  =  0.00288536248748
stetson_k  =  0.818806661331
weighted_mean  =  12.14
weighted_std  =  1.05011714217
