-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.86


######### Lightcurve features #########

amplitude  =  0.464310249655
cusum  =  0.138274666126
eta  =  0.740023976735
hl_amp_ratio  =  0.434133745575
kurtosis  =  -0.726848586577
n_points  =  256
period  =  0.526474598985
period_SNR  =  40.5196632699
period_log10FAP  =  -31.7691435546
period_uncertainty  =  0.000133606047653
phase_cusum  =  0.241381321503
phase_eta  =  0.0570691772498
phi21  =  -2.22718304766
phi31  =  -1.0531056476
quartile31  =  0.6125
r21  =  0.541432694841
r31  =  0.346347520009
shapiro_w  =  0.924260318279
skewness  =  -0.632853772627
slope_per10  =  -0.218378691581
slope_per90  =  0.256420499853
stetson_k  =  0.782842109193
weighted_mean  =  10.841769695
weighted_std  =  0.398655851762
