-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.179371100762
cusum  =  0.100924131826
eta  =  0.56555964967
hl_amp_ratio  =  0.706209752826
kurtosis  =  -1.18961947452
n_points  =  403
period  =  0.81959713835
period_SNR  =  58.6728839165
period_log10FAP  =  -57.4790990312
period_uncertainty  =  0.000190144112077
phase_cusum  =  0.281947312958
phase_eta  =  0.307729565927
phi21  =  -1.69903539935
phi31  =  -3.32056563759
quartile31  =  0.28
r21  =  0.422849982779
r31  =  0.150426224125
shapiro_w  =  0.954975485802
skewness  =  -0.0752785991898
slope_per10  =  -0.221956532154
slope_per90  =  0.219903119932
stetson_k  =  0.840018376625
weighted_mean  =  14.4664046058
weighted_std  =  0.160509302129
