-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.88


######### Lightcurve features #########

amplitude  =  0.378144274365
cusum  =  0.137443632518
eta  =  0.613102148426
hl_amp_ratio  =  0.56987248718
kurtosis  =  -0.697919899227
n_points  =  199
period  =  0.617028993907
period_SNR  =  25.0212778206
period_log10FAP  =  -20.5813779366
period_uncertainty  =  0.000109286045429
phase_cusum  =  0.302406240322
phase_eta  =  0.115680288341
phi21  =  1.08247029422
phi31  =  2.15269623981
quartile31  =  0.5
r21  =  0.574863361276
r31  =  0.360608051741
shapiro_w  =  0.944759786129
skewness  =  -0.52803524014
slope_per10  =  -0.210706188387
slope_per90  =  0.296645044432
stetson_k  =  0.814842986799
weighted_mean  =  13.2760244966
weighted_std  =  0.32342386847
