-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.91


######### Lightcurve features #########

amplitude  =  0.170692517662
cusum  =  0.0743974630622
eta  =  0.703318681663
hl_amp_ratio  =  1.10110241398
kurtosis  =  -0.609455699194
n_points  =  290
period  =  0.635657297729
period_SNR  =  36.5962617597
period_log10FAP  =  -38.2430320563
period_uncertainty  =  0.000115322445176
phase_cusum  =  0.25799898939
phase_eta  =  0.347659810998
phi21  =  -1.90100436471
phi31  =  -3.08248935873
quartile31  =  0.22
r21  =  0.345076841537
r31  =  0.163374543111
shapiro_w  =  0.982426404953
skewness  =  -0.0691810534824
slope_per10  =  -0.244700491817
slope_per90  =  0.228249717909
stetson_k  =  0.845756235057
weighted_mean  =  12.8171140553
weighted_std  =  0.138118198515
