-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.320376100763
cusum  =  0.112707898896
eta  =  0.802785396422
hl_amp_ratio  =  0.481708002389
kurtosis  =  -0.838948133737
n_points  =  266
period  =  0.668278039141
period_SNR  =  37.1906635691
period_log10FAP  =  -29.4251420365
period_uncertainty  =  0.000229841905564
phase_cusum  =  0.308616874294
phase_eta  =  0.354736113575
phi21  =  -2.33845491734
phi31  =  -4.0995876538
quartile31  =  0.5375
r21  =  0.514204535418
r31  =  0.32211310927
shapiro_w  =  0.93525737524
skewness  =  -0.371378104486
slope_per10  =  -0.143695016521
slope_per90  =  0.212366669439
stetson_k  =  0.797813892665
weighted_mean  =  14.9404411562
weighted_std  =  0.310836382543
