-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.182929521971
cusum  =  0.149916589558
eta  =  0.46442049402
hl_amp_ratio  =  0.619347074115
kurtosis  =  -1.14856656141
n_points  =  253
period  =  0.622835816139
period_SNR  =  37.2554780982
period_log10FAP  =  -34.5168702315
period_uncertainty  =  0.000190353261213
phase_cusum  =  0.28784303654
phase_eta  =  0.18576530294
phi21  =  1.04945867302
phi31  =  2.38053420414
quartile31  =  0.28
r21  =  0.416611080928
r31  =  0.275503653466
shapiro_w  =  0.934605300426
skewness  =  -0.364771318705
slope_per10  =  -0.218821365157
slope_per90  =  0.437025590038
stetson_k  =  0.842955359757
weighted_mean  =  13.9562896711
weighted_std  =  0.165582854834
