-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.290635154171
cusum  =  0.133074174519
eta  =  0.551926936383
hl_amp_ratio  =  0.452657270358
kurtosis  =  -0.892918313257
n_points  =  359
period  =  0.66986348832
period_SNR  =  45.962588406
period_log10FAP  =  -50.2521085735
period_uncertainty  =  0.00012537686435
phase_cusum  =  0.280260942256
phase_eta  =  0.0654677793163
phi21  =  -2.24022959746
phi31  =  -3.99411068358
quartile31  =  0.38
r21  =  0.48857788061
r31  =  0.297757314129
shapiro_w  =  0.927286922932
skewness  =  -0.542525573183
slope_per10  =  -0.164614994046
slope_per90  =  0.380937956403
stetson_k  =  0.770244764885
weighted_mean  =  14.3748929946
weighted_std  =  0.237740652285
