-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  1.0


######### Lightcurve features #########

amplitude  =  0.189419170944
cusum  =  0.137717697912
eta  =  0.496197084426
hl_amp_ratio  =  0.471402521685
kurtosis  =  -0.493695002892
n_points  =  310
period  =  0.606209115026
period_SNR  =  45.1085128019
period_log10FAP  =  -37.5966466505
period_uncertainty  =  0.000104692099403
phase_cusum  =  0.28323800041
phase_eta  =  0.466980725226
phi21  =  -2.06058866862
phi31  =  -0.9505201333
quartile31  =  0.26
r21  =  0.357441888207
r31  =  0.216419095598
shapiro_w  =  0.930540382862
skewness  =  -0.694096045858
slope_per10  =  -0.176300966984
slope_per90  =  0.144505565278
stetson_k  =  0.783080279109
weighted_mean  =  14.4486641474
weighted_std  =  0.168098153128
