-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.295457423263
cusum  =  0.148041576068
eta  =  0.499788286739
hl_amp_ratio  =  0.768679952765
kurtosis  =  -0.960946857723
n_points  =  446
period  =  0.671827262781
period_SNR  =  46.4974251459
period_log10FAP  =  -53.4473905736
period_uncertainty  =  0.000117781781663
phase_cusum  =  0.222204216485
phase_eta  =  0.30438474876
phi21  =  1.09080229789
phi31  =  2.39836019685
quartile31  =  0.4
r21  =  0.495795813096
r31  =  0.268059370434
shapiro_w  =  0.9432964921
skewness  =  -0.387157010472
slope_per10  =  -0.107326382489
slope_per90  =  0.166971459605
stetson_k  =  0.831885066028
weighted_mean  =  13.6693187674
weighted_std  =  0.268794285659
