<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  0  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.99


######### Lightcurve features #########

amplitude  =  0.243245893812
cusum  =  0.0656459626644
eta  =  0.63052720503
hl_amp_ratio  =  0.701084028508
kurtosis  =  -0.934897869307
n_points  =  406
period  =  0.579313966026
period_SNR  =  57.8694771969
period_log10FAP  =  -55.3653751998
period_uncertainty  =  9.4981961729e-05
phase_cusum  =  0.217923023961
phase_eta  =  0.144970612402
phi21  =  -1.98618783404
phi31  =  -0.637112345886
quartile31  =  0.32
r21  =  0.481054674937
r31  =  0.257641494361
shapiro_w  =  0.959470510483
skewness  =  -0.328867089866
slope_per10  =  -0.128845227404
slope_per90  =  0.152630783972
stetson_k  =  0.823176364664
weighted_mean  =  15.1200486569
weighted_std  =  0.2023694225
</pre></body></html>