-------------------
| pyFFTW detected |
-------------------


######### Classification results #########

flag =  1  (0 - classification success, 1 - suspicious period)
class =  RRL_ab
class_probability =  0.51


######### Lightcurve features #########

amplitude  =  0.368475419011
cusum  =  0.23882390015
eta  =  2.4754044463
hl_amp_ratio  =  0.712617905948
kurtosis  =  -0.300994428055
n_points  =  17
period  =  0.509940500835
period_SNR  =  7.04500233359
period_log10FAP  =  0.0
period_uncertainty  =  0.000116071439527
phase_cusum  =  0.301962384364
phase_eta  =  0.610086198483
phi21  =  -1.70969906964
phi31  =  -2.42690999816
quartile31  =  0.36
r21  =  0.178843857271
r31  =  0.193212771887
shapiro_w  =  0.958252847195
skewness  =  -0.198955440092
slope_per10  =  -0.363232357027
slope_per90  =  0.585726750589
stetson_k  =  0.755801602086
weighted_mean  =  13.4648104956
weighted_std  =  0.27879144991
